10.8

10.85

10.9

10.95

11

11.05

11.1

11.15

11.2

-1 -0.75 -0.5 -0.25 0 0.25 0.5 0.75 1

(N(1/2-) - N(3/2-)) / (N(1/2-) + N(3/2-))

Gamma-ray Peak Energy (MeV)

3/2- 100Ψ

1/2- 100Ψ 10°∼16° 7°∼10° 0°∼7°

Ex(1/2-) - Ex(3/2-) = 114 Α 52 keV Preliminary