0

200

400

600

800

1000

1200

1400

1600

-10 -8 -6 -4 -2 0 2 4 6 8 10

D6 Beamline TOF (ns)

Counts

Kaon

Pion

0

5000

10000

15000

20000

25000

30000

35000

40000

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Particle Mass in Spectrometer (GeV/c**2)

Counts

Pion

Kaon